Copyright: XCLOCK HELP 1993 by W. Kienemund


Contents
XCLOCK for Windows

            Version 2.3

Contents

1. XCLOCK Features

2. Installation

3. Update to Version 2.3

4. Configuration

5. XCLOCK Main Window

6. Local Clock Window

7. Daylight Savings Time

8. Registration

9. About XCLOCK

Special Offer

Announcement :  XL_CLOCK

Press F1 key to get help when working in XCLOCK


 	XCLOCK Main Window

Contents

Local Clock

Click the part of XCLOCK's main window you want to know more about


Exit Menu
Menu  Exit

 XCLOCK Main Window

Load XCLOCK Lite

If you are familiar with XCLOCK, there is a Lite Version for daily use to save Windows memory. This version offers only 9 separate clock windows and Xclock's alarm settings.

Load XCLOCK Small

Loads Xclock Small Version to save more Windows memory for Notebooks and Laptops.

This version offers only one local clock window (incl. Control Center) and the main clock window with 12 different displays.

Load XCLOCK Mini

Loads XCLOCK Mini Version, only a small local clock that offers Control Center with fast access to XCLOCK's Main Program.

Save Setup

To save all settings to XCLOCK.CFG configuration file confirm Save in Current Setup Window.

Quit

Closes XCLOCK.

If XCLOCK is closed by Exit Menu, by Control Box or by closing Windows, Xclock asks to save new configurations if setup has changed.


GMT and Local Time Display
GMT / Local Time Display

Mouse_Dbl_Click to load a separate Local Clock Window

Change Local or GMT Display in Menu Settings


Settings Menu

 XCLOCK Main Window

Local

Set the Local Time to a certain Time Zone.
This is stored in XCLOCK.CFG file and restored on next start of XCLOCK
Local Time Zone is displayed by different colors of location, date and time.

Location is signed by an asterisk.

Colors

Set Colors for Main Window in Color Setup Window  ( ? to open / close little help frame )

Set Colors for Additional Separate Clocks

Showinterval

Checked: shows main window and loaded separate clocks in selected intervals (full /half /quarter)

Sound: if checked, there is also a sound added (if a Sound card is installed for Windows 3.1).

HOUR.WAV is played at full hours, QUARTER.WAV at quarters and half hours  (if interval is set to 15 or 30 min). To play your favorite wave, please save one as HOUR.WAV and one as QUARTER.WAV.

12 / 24 Hour Clock

Changes all displays to 12 or 24 hours format

System Clock

XCLOCK uses your PC's internal system clock to calculate international dates and times. Please make sure that local date and time are set correctly.

To set date and time click on System Time and use Windows Control Panel.

New settings of date and time by Windows Control Panel are detected by Xclock, but allow max. 1 minute for complete refreshing all Xclock displays.

Calendar

In Alarm Setup window "Calendar" button runs Windows Calendar or any user defined Windows application.

Input box to enter your program :

Path\Programname.Extension    Parameters (optional)

Example:

C:\OFFICE\MYTIMER.EXE     MYNAME.TIM

Autochange

If checked, DST change of local time zone changes your internal PC system clock permanently for  + 1 hour  or  - 1 hour;

see also  Daylight Savings Time

GMT Display

Checked shows Greenwich Mean Time instead of System Time in main window

Time at Icon

If checked : Mouse Click on City area and minimize Xclock to icon shows city and related time at icon. City and time display are saved on exit (if conf.)

Unchecked: If XCLOCK's main window is iconized, Windows built-in screen saver may not work. This depends on refreshing icon time display every minute. Unchecked Time at Icon will solve this problem.

Save Positions

Checked : All positions of clock windows are saved, if Xclock is closed by Windows Program Manager or any other desktop program.

Unchecked : To solve problems (corrupted xclock.ini file) with other desktops than Windows Program Manager, positions are not saved when Xclock is closed by any desktop program.

To save positions use Save Setup of Exit Menu.

For Lite and Small version use Button in Local Clock Control Center.

Positions are always saved, when Xclock is closed by Local Clock's Exit .

Alarm Sound

Checked : Every 15 seconds ALARM.WAV is played on alarms (if a Sound card is installed)

To play your own wave file for alarms save it as ALARM.WAV

Unchecked : Every 15 seconds 3 Beeps on alarms (sound of beeps depends on hardware)


Xclock Lite and Small
XCLOCK Lite Version

 XCLOCK Main Window

If you are familiar with XCLOCK, there is a Lite Version for daily use to save Windows memory. This version offers only 9 separate clock windows and Xclock's alarm settings.

Load Lite Version

Use Exit menu and Load XCLOCK Lite to run lite version.

Run Main Program

MAIN button in Local Clock Control Center loses LITE and starts XCLOCK MAIN Program. local time zone, cities, colors etc. you have to run Xclock main program.

Alarms

Dbl_click on time display to open alarm windows or control Center

Save Setup

Save Setup Button is enabled, if Save Position is unchecked in main menu.

Press button to save setup immediately, there is no current setup information window.

It is recommended to run XCLOCK LITE with stay on top enabled for local clock to have quick access to all features. There is no option to run lite version iconized.

If lite version is closed, next start of Xclock is lite version.

To run Xclock main program on next start, close Xclock when running main program.


XCLOCK Mini Version

 XCLOCK Main Window

This version offers only one local clock window (incl. Control Center)

Load Xclock Mini Version to save more Windows memory for Notebooks and Laptops

Load Mini Version

Use Menu Exit in Main Program

Open Control Center

Dbl_Click on time display

Size, 12/24 hour display, seconds, city display and stay on top feature are for Mini Version only.

Colors depend on main program settings.

Alarms

Run Main Program (or Xclock Lite / Small ) for alarm settings.

If an alarm is detected, main program is loaded and alarm window is shown.


XCLOCK Small Version

 XCLOCK Main Window

This version offers only one local clock window (incl. Control Center) with 12 different displays.

Load Xclock Small Version to save more Windows memory for Notebooks and Laptops

Load Small Version

Use Menu Exit in main program

Alarms

DblClick on time displays to set alarms, run Main to change all other settings.

Save Setup

Save Setup Button is enabled, if Save Position is unchecked in main menu.

Press button to save setup immediately, there is no current setup information window.

GMT Display

Mouse_Click on GMT display area to show / hide Greenwich Mean Time

If small version is closed, next start of Xclock is small version.

To run Xclock main program on next start, close Xclock when running main program.


DAYLIGHT SAVINGS TIME

Location List Editor

XCLOCK is designed for power users to handle appointments, transactions, communications etc. world-wide exactly.

Besides settings of your PC clock and time zone it is most important to set daylight savings time. For many European countries and most US-States dst setup is easy, Xclock calculates dst time periods for any year. But there are many irregular dst time periods in different countries of the world, you have to edit this only once in a year for some locations you are really interested in ("Special" DST setup in Location List Editor).

This is why Xclock gives you access to all settings of any location. Time zones and DST settings are shown in Setup Window, there is no hidden and undocumented setup inside of Xclock.

 XCLOCK is able to change your PC system time when DST starts or ends, this feature is enabled if AUTOCHANGE is checked in SETTINGS. If AUTOCHANGE is not checked, please set PC time and date manually if DST changes for your local time zone.

XCLOCK saves last local DST ( "yes" or "no" in Current Setup Info) on exit. Next start Xclock checks for DST change. If DST has changed, there is a warning in main window. If AUTOCHANGE is enabled, Xclock has already changed internal system clock for 1 hour, otherwise set your PC clock using Windows Control Panel (= SETTINGS / System Time in Xclock menu) to new time. When XCLOCK is running and DST changes, you will get that warning immediately.

!!!  XCLOCK changes time from 02:00:00 to 03:00:00 on first day of DST

!!! and from 03:00:00 to 02:00:00 on last day of DST (24 hour clock)


Time Display

Mouse_Dbl_Click opens Alarms window

to set or change alarm times and messages


City Display
Time Zone / City / Country Display

Mouse_Click to select time zone for icon display

Mouse_Dbl_Click to Change Location Display for this clock


Menu Clocks
Clocks

Select from menu to Load / Unload additional Separate Clock Windows.

Stay on Top ability available in Local Clock Control Center only.

Arrange moves Clocks to the left side of the screen.


Help

Xclock Help loads this XCLOCK HELP FILE

User Note : Write down your notes and iconize

window for fast access.

About shows Xclock's About Box


City Display Separate Clocks
Time Zone / City / Country Display

Mouse_Dbl_Click to Change Location Display for this clock


Local City Display
Local City / Local Date

Mouse_Dbl_Click

- to hide all loaded clock windows

  with Stay TOP unchecked

- to show all loaded clock windows


Local Clock Size
To Change

- Time display

- City display

- Size

- Staying on Top of all windows

of Local Clock


12 / 24 Hour Display

changes Time Displays of all clocks


Local Clock Control Center

 	XCLOCK Main Window

Click the part of XCLOCK's Separate Clock Windows you want to know more about


Colors of Separate Clocks

Loads Color Setup for Separate Clock Windows only


Additional Separate Clocks

Push button to load / unload separate clocks

Top checked clocks stay on top of all windows


Local Time

Mouse_Dbl_Click to open / close this Control Center


Unload Local Clock

Unloads Local Clock Window only


Exit

Saves Configuration and Positions immediately

and closes XCLOCK


Quit Windows

STOP button stops Windows session as fast as possible

Dbl_Click on STOP saves Xclock.cfg and Xclock.ini without Setup Info.

Windows session is closed immediately, but changes of your works in

other Windows applications will be saved if confirmed.


Alarms

opens Alarms window

to set or change alarms


Alarms

 	XCLOCK Main Window

Local Clock

Click the part of XCLOCK's Alarms window you want to know more about


Alarm Time Label
Alarm Label

Mouse_Dbl_Click on green Alarm number

or free label to edit new alarm in

Alarm Setup Window

Mouse_Dbl_Click on red alarm number

or alarm time label to change or delete saved alarm

in Alarm Setup Window

Mouse_Click and hold down on Alarm time label

to show related local alarm time

!  If you are changing red alarm settings # 1 to # 6,

   Xclock does not check for alarms until changes are done.

!!  All alarm settings are sorted to according local alarm times.

    This is why for different cities/time zones some settings looks unsorted.


Alarm #

Scroll through 250 Alarms


Local City

Push button to show related local alarm times

of all alarms above.


Alarm Setup

Alarms

XCLOCK ALARM

Click the part of XCLOCK's Alarm Setup window you want to know more about


Alarm Time Zone

Select City / Time Zone from list box


Alarm Date and Time

Use Scrolls to set Day, Month, Year, Hour, Minute for alarms.

XCLOCK's Alarm Window is shown at alarm time.


Alarm Message

Textbox to enter Alarm Message

(supports Windows copy and paste feature)


Local Alarm Time

Local Time according to selected alarm time/city.


Calendar

Loads file XCLOCK.CAL into Windows Calendar (default setting)

or runs any user defined program, depending on "Calendar" setup

in Menu Settings


Delete Alarm  deletes Alarm settings from alarm file

Set Alarm  saves Alarm settings to XCLOCK.ALM  alarm file

Cancel   all new settings above are cancelled


Location Setup

 	XCLOCK Main Window

Local Clock

Click the part of XCLOCK's Location Setup window you want to know more about


Locations

Select Location from list box;

list depends on Xclock's data file

XCLOCK.DAT


Time Difference

Shows Time Difference to Greenwich Mean Time

for selected Location / Time Zone


DST Settings

Shows DST Settings for selected Location / Time Zone


Opens Location List Editor

to add new Location / Time Zone to the list above

to change Location / Time Zone settings in the list


OK

Changes Clocks Location Display

to selected city / time zone

Cancel

No Changes to Clock Display


Location List Editor

 	XCLOCK Main Window

Local Clock

Click the part of XCLOCK's Location List Editor you want to know more about


Number of Locations / Time Zones

in data file XCLOCK.DAT


Location / Time Zone

Select Location to edit settings

or enter new Location / Time Zone

Xclock uses up to 14 letters for clock displays

until a comma is detected.

All characters behind first comma are stored to data file

for informations but are not used for clock displays.


Time Difference to Greenwich Mean Time

Shows time difference of selected City / Time Zone

to GMT

Use Scrolls to enter new time difference

of selected time zone to GMT

Example


DST Setup

Choose DST settings for selected City / Time Zone

None   no DST for this time zone

US Standard

XCLOCK calculates begin and end of DST ("Summer Time")

Begin :  Fist Sunday in April

End    :  Last Sunday in October

UK-Standard

XCLOCK calculates begin and end of DST

Begin :  Last Sunday in March

End    :  4th Sunday in October

European Standard

XCLOCK calculates begin and end of DST

Begin :  Last Sunday in March

End    :  Last Sunday in September

Special

Use enabled scrolls to set

Month, First Day, Last Day

and Time Diff. to GMT for

Daylight Savings Time


DST Settings

Shows begin, end and time difference of DST

for selected City / Time Zone

If Special is selected, all scrolls are enabled

to enter special DST settings.

Example


Example for Time Differences to GMT

Greenwich Mean Time  12.00

City	Time	Time 	DST Time
Differ.	Difference

Sydney	22.00	+ 10	+ 10
Tokyo	21.00	+   9	+   9
Paris	13.00	+   1	+   2
London	12.00	    0	+   1
Rio de Janeiro	09.00	 -  3  	 -   3
New York	07.00	 -  5	 -   4
Chicago	06.00	 -  6	 -   5
Denver	05.00	 -  7	 -   6
Los Angeles	04.00	 -  8	 -   7


Add new entry

adds new location to Xclock's data file XCLOCK.DAT

Change entry

Changes settings for selected location in data file

Delete entry

deletes selected location from data file

Help

opens XCLOCK's Help

Done

Closes Location List Editor

and returns to Location Setup


XCLOCK  Alarm

XCLOCK Main Window

Alarm Setup

Click the part of XCLOCK's Alarm Setup window you want to know more about

Xclock's Alarm Window stays on top of all windows.

If alarm times has passed between two sessions, you will get the alarms when XCLOCK starts.


Alarm Time

Shows saved Alarm Time and City / Time Zone


Time now

Recent Time at Alarm Time Zone


Alarm Message

Saved Alarm Message for this alarm time and city


Stop Beeps / Stop Sound

Every 15 seconds there are 3 beeps or an alarm sound

(if enabled in Menu Settings)

Push Button to stop beeps / sound for this alarm.

! If you don't want beeps or sound for all alarms,

  enable alarm sound in Menu Settings

  and delete ALARM.WAV in Xclock directory.


Close Alarm Window

You will get no more alarms until Alarm Window is closed !


XCLOCK Features

Contents

World Clock with extended setup for all time displays, time zones and alarms to any city or country in the world. Data File for about 150 Cities and related Time Zones included. XCLOCK and its powerful alarm component is developed for users dealing with trade and communication world-wide.

XCLOCK's accuracy depends on its versatile abilities for time zones and daylight savings time settings.

XCLOCK changes your internal PC system clock automatically if DST changes for local time zone.

Lite version included for daily use to save Windows resources

Small and Mini versions included for Laptops and Notebooks

 - 12 time displays in main window (stays on top in Windows 3.1)

 - time display at icon

 - additional local clock window (stays on top of all windows in W 3.1)

 - 8 additional separate clock windows (stay on top in Windows 3.1)

 - 250 alarm settings, saved to next Windows sessions

 - user-defined colors

 - sizeable XCLOCK window, position and size saved to next session

 - location list editor with special setup for daylight savings time

 - Xclock supports daylight savings time settings for all locations

 - user notepad

 - start of a user defined program

 - support file for Windows Calendar

 - supports Windows sound (wave files)

 - Xclock's visual help for every important window

XCLOCK is a Shareware application for Windows 3.1

If you continue to use XCLOCK after a trial period of 30 days you are required to register this program.

How to register XCLOCK


Installation

Contents

VBRUN200.DLL

XCLOCK is written in Visual Basic 2.0. You need VBRUN200.DLL to run this application.

This Runtime Module (Copyright to Microsoft Corp.) is needed only once to run Visual Basic 2.0 applications. Please copy VBRUN200.DLL to your Windows System Directory.

 It is also available on CompuServe and many BBS. On CIS use IBM File Finder (go IBMFF) and search for VBRUN2.ZIP or VBRUN*.*

Setup Program

Make sure that VBRUN200.DLL is in your Windows System Directory.

The Installation Program copies all Xclock files to a directory and creates a Program Manager Group :

1. Open Windows File Manager and change to the directory containing all Xclock files. Start SETUP.EXE by dbl-clicking.

Or use File - Run - Browse feature of Program Manager to run SETUP.EXE

2. Confirm disk and directory (you may edit even a new one), then start Setup program.

Install without Setup Program

Copy all XCLOCK files except setup.exe, xinstall.exe, setup.lst, setupkit.dll and ver.dll to your xclock directory. Copy vbrun200.dll to your Windows System Directory.

Start the Windows Program Manager and install XCLOCK.EXE like other Windows applications: choose New and use Browse feature to select directory and XCLOCK.EXE file.


Update
Update to Version 2.3

Contents

Look for VBRUN200.DLL

XCLOCK is written in Visual Basic 2.0. You need VBRUN200.DLL to run this application.

This Runtime Module (Copyright to Microsoft Corp.) is needed only once to run Visual Basic 2.0 applications. Please copy VBRUN200.DLL to your Windows System Directory.

In XCLOCK.ZIP file it is not included but it is also available on CompuServe and many BBS. On CompuServe use IBM File Finder (go IBMFF) and search for VBRUN2.ZIP or VBRUN*.*

Save Configuration of XCLOCK 2.2

If XCLOCK 2.3 is installed by Setup Program to the same directory of another version of XCLOCK, all files will be overwritten.

Please save XCLOCK.CFG, XCLOCK.INI, XCLOCK.DAT and XCLOCK.ALM before, if you would like to keep your old configuration, locations and alarm settings. Copy these files to your XCLOCK 2.3 directory after installation. File format of XCLOCK.CFG has changed, but the old format of XCLOCK 2.2 is detected and changed by Xclock to new one.

Registered users has to save their registered XCLOCK.EXE file, containing registration name.

Copy XCLOCK.EXE to Xclock 2.3 directory after installation to register new version and keep VBRUN100.DLL in your Windows System Directory, because XCLOCK.EXE was written in Visual Basic 1.0


Configuration

Contents

Set new Cities / Time Zones

Set 12 time zone displays of Xclock's main program and 8 displays of additional clocks to any city/time zone by mouse_dbl_click on location display.

Set Local Time Zone

Use Local of Menu Settings in Xclock's Main Window to attach a city/time zone to your computer's system time.

Set Alarms

Set alarms by Mouse_Dbl_Click on time displays in Main Window and Separate Clocks.


Registration of XCLOCK

Contents

Thank you for giving XCLOCK a try.

XCLOCK is a SHAREWARE application for Windows 3.1

You may evaluate this program for 30 days, then you have to delete it or go for registration.

Registered Version

For registered users, the start-up screen changes to a personal license screen and XCLOCK is loaded immediately without user input. And there is no About Window on exit.

Registration changes also update versions of XCLOCK 2.3 to registered versions, so there is no need for further registrations. All updates of XCLOCK are contributed to CompuServe.

Registered users will get support by e-mail on CIS:

Wilfried Kienemund,    CompuServe ID #  100015,2550

Order Registration Code only

Order Registered Version on Disk  ( 3 1/2 "  or  5 1/4 " )

Special Offer for Companies


Order Registration Code
Registration Order /1

Registration of XCLOCK

Order Registered Version on Disk

Order Registration Code

Last version of XCLOCK is always available on CompuServe. Look for new version of XCLOCK at CompuServe: Use IBM File Finder (go IBMFF) and search for XCLOCK.ZIP.

If you have an unregistered copy of XCLOCK 2.3, you need only a registration code to register your version. Please order your registration code direct from the author or from Shareware Registration Service of CompuServe ( go SWREG ).

Registered users will only get a License #., a Registration Code and a Registration Name from the author to change unregistered version to registered ones. No disks or files are send.

1.  Order your registration code direct from the Author

Send your order by E-Mail  or Fax to

Wilfried Kienemund,    CompuServe ID #  100015,2550

Fax   049  211 203490

049   International code for Germany

211   City code for Duesseldorf

203490   Fax number

Please mail

Your CompuServe ID #, any other electronic mail service address connected to CIS or your Fax number you want to receive your order.

Number of Licenses

Registration Name  (if you want a registration for a friend or company)

You will get your License #, Registration Code and Registration Name by E-Mail or Fax.

Please send bank cheque to the author's address after receiving registration code.

Wilfried Kienemund

Am Ginsterberg 11

40627 Duesseldorf

Germany

Registration Price

US  $   25.00  for each license

or any other currency at same value.

European Countries:

If you pay by EC-Cheque, please enter DM for currency and

DM  35,00  for each license .

For other cheques you have to pay as much as US $ 25.00 in your currency.

===================

Send a letter to the author :

Wilfried Kienemund

Am Ginsterberg 11

40627 Duesseldorf

Germany

Please mail

Your address or your Fax number you want to receive your order

Number of Licenses

Registration Name  (if you want a registration for a friend or company)

You will get your License #, Registration Code and Registration Name by Mail or Fax.

Please include bank cheque for registration price.

Registration Price

US  $   25.00  for each license.

European Countries:

If you pay by EC-cheque, please enter DM for currency and

DM  35,00  for each license .

For other cheques you have to pay as much as US $ 25.00 in your currency.

===================

2.  Order your registration code by CompuServe's Shareware Registration Service

Members of CompuServe will get their registration of XCLOCK by CIS Shareware Registration Service.

Please go to this section by  GO SWREG  and look for XCLOCK. The registration fee is added to your CIS bill. You will get your registration code by CIS e-mail from the author as fast as possible.


Order Registered Version on Disk
Registration Order /2

Registration of XCLOCK

Order Registration Code

Order Registered Version on Disk

If you really need a disk of XCLOCK registered version,

please mail disk size and a bank cheque to:

Wilfried Kienemund

Am Ginsterberg 11

40627 Duesseldorf

Germany

Registration price for each disk :  US $  30.00  (incl. shipping)

(in Europe   DM  40,00 ,   EC-Cheque  only)

========================================

You may also look at  SOFTWARE  EXCITEMENT!  for registered version on disk.

Fax : 	503-826-8090

Phone :	800-444-5457

Software Excitement! will accept credit cards.

========================================


About XCLOCK

Contents

XCLOCK 2.3  for Windows  ( Release Nov. 1993 )

Copyright 1993 by

Wilfried Kienemund

Am Ginsterberg 11

40627 Duesseldorf

Germany

Fax  049  211 203490

( 049 ) International code for Germany

( 211 ) City code for Duesseldorf

20 34 90  Fax number

Support by the Author via email

CIS  ID #  100015,2550

Improvements

-  4 different Versions in one package

-  New Alarm Window

-  Windows Help File

-  Sound Support

---------------------------------------------------

 XCLOCK Files

 - XCLOCK.EXE   	Xclock loading program

 - XLOAD.INI        	Xclock Init file for loading program

 - XCLOCK.BMP     	Bitmap file for loading screen

 - XCLOCK23.EXE 	Xclock main program

 - XCLOCK-L.EXE 	Xclock Lite program

 - XCLOCK-S.EXE  	Xclock Small program

 - XCLOCK-M.EXE  	Xclock Mini program

 - XCLOCK.CFG   	Configuration file (locations, colors etc. / main program)

 - XCLOCK.INI    	Init file (positions, locations, colors etc. of clocks )

 - XCLOCK.ALM     	Alarm settings

 - XCLOCK.DAT     	Data file for location setup

 - XCLOCK.HLP     	Help file (this file)

 - XCLOCK.NOT      	User Note file

 - XCLOCK.CAL     	Calendar file (using Windows Calendar)

 - ALARM.WAV	Wave File for Alarm Sound

 - HOUR.WAV	Wave File for Sound on full hours

 - QUARTER.WAV	Wave File for Sound on quarters

 - SETUP.EXE      	VB Installation Program

 - XINSTALL.EXE   	XCLOCK Installation Program

 - SETUP.LST	Installation File

 - SETUPKIT.DLL    	Installation DLL

 - VER.DLL	Windows DLL

---------------------------------------------------

XCLOCK is written in Visual Basic 2.0

Windows and Visual Basic

are trademarks of Microsoft Corp., USA


Special Offers
 XCLOCK Special Offer for Companies only

Registration of XCLOCK

1. Special Edition of XCLOCK

Do you need a special present for your customers ?

We will include your name, address and phone/fax number in About Window of XCLOCK and you have the right to give a license of XCLOCK's Special Edition as a gift to your customers. This special offer starts from 50 licenses, please ask the author for discount prices ( Fax  +49  211  203  490 )

2  Company License

Do you need a Multi License Package to run XCLOCK on many Computers in your company ?

This special offer starts from 10 licenses, please ask the author for discount prices

( Fax  +49  211  203  490 )


XL-CLOCK
XL_CLOCK  for Windows

Xtra Large Clock Display

Do you need a large clock display for your office, show-room or shop-window ?

We introduce XL_CLOCK,  a  full screen clock display  with 4 different time displays.

Based on XCLOCK's versatile time zones and dayligth savings time features, it shows the time of your most interested time zones / cities in the world ( example: important places for stock exchange like New York, London, Frankfurt, Tokyo or others)

XL_CLOCK is NOT a Shareware application, therefore only a DEMO version is included in this XCLOCK shareware package. Please create a new directory for demo installation files and decompress DEMO.ZIP separate from your Xclock installation files. Install XL_CLOCK Demo Version into your Xclock directory by running SETUP.EXE from your File Manager.